<template>
	<!-- 自主学习详情 -->
	<view class="myAssdetail-box">
		<page-title :showBack="true">课程学习</page-title>
		<iframe :src="urlEE" style="width: 100%;height: 100%;" :style="{'height':pageHeight}" frameborder="0"></iframe>
	</view>
</template>

<script>
	export default {
		data(){
			return{
				id:'',
				urlEE:'',
				type:'',
				pageHeight:'100%'
			}
		},
		onLoad(options) {
			//console.log(options.id)
			this.id = options.id
			this.type = options.type
		},
		mounted(){
			//此页面，因为没有ajax请求，也没有对token的检查
			this.pageHeight=(this.$height-40)+'px';
			console.log('页面的高度：'+this.pageHeight);
			let urlPre=window.location.protocol+'//'+window.location.host;
			 // if(this.type = 10){
				this.urlEE= `${urlPre}/m/cdetail?id=${this.id}&type=${this.type}&inner=1` 
			 // }
		}
	}
</script>

<style>
	.myAssdetail-box{
		width: 100%;
		height: 100%;
	}
	body{
		width: 100%;
		height: 100%;
	}
	uni-page-body{
		height: 100%;
	}
</style>
